-- Fix: set use_exact = true for all existing room_ai records
-- This changes the default behavior so AI only responds when explicitly @mentioned.
-- Previously use_exact defaulted to false, causing AI to reply to every message.
UPDATE room_ai SET use_exact = true WHERE use_exact = false;
